Center at RA 20 02 10.41830 DEC 47 25 28.7730

CONT: J2002 IPOL 22233.390 MHZ J2002.ICL001.2

PLot file version 1 created 12-AUG-2003 11:43:25

Cont peak flux = -8.8827E-02 JY/BEAM Levs = 8.797E-02 * (-0.136, 0.136, 0.272, 0.545)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40