Center at RA 09 27 03.01380 DEC 39 02 20.8510

CONT: 4C39.25 IPOL 22233.560 MHZ 4C39.25.ICL001.2

PLot file version 1 created 12-AUG-2003 11:58:11

Cont peak flux = 3.7226E-01 JY/BEAM Levs = 3.723E-01 * (-0.238, 0.238, 0.476, 0.951)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40