Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 16:36:09

1R EB 5 0 -5 2R WB 10 5 0 -5 4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -5 -10 6R TR 10 0 -10 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 16:36:13

1R EB 0 -5 2R WB 360 358 356 354 352 4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -5 6R TR 10 0 -10 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 16:36:17

1R EB 5 0 -5 2R WB 10 5 0 -5 4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -5 -10 6R TR 10 0 -10 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol IF 4

Plot file version 4 created 08-OCT-2002 16:36:21

1R EB 5 0 -5 2R WB 10 0 -10 4R MC

0.010 0.005 0.000 -0.005

5R NT 5 0 -5 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 08-OCT-2002 16:36:25

1L EB 30 20 10 0 -10 2L WB 10 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 10 0 -10 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 16:36:29

1L EB 5 0 -5 2L WB 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 -10 6L TR 10 0 -10 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 16:36:33

1L EB 30 20 10 0 -10 2L WB 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 10 0 -10 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

10 0 -10

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 16:36:37

1L EB 5 0 -5 2L WB 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT

10.110 10.105 10.100 10.095

6L TR 10 0 -10 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

5 0 -5 -10 -15

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 16:41:20

1R EB 20 0 -20 -40 -60 2R WB 0 -50 -100

4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -50 -100 -150

6R TR

-12.565 -12.570 -12.575 -12.580

7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

300 200 100

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 16:41:24

1R EB 12 11 10 2R WB 20 0 -20 -40 4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -50 -100

6R TR 0 -20 -40 -60 -80 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

20 0 -20

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 16:41:28

1R EB 0 -50 -100

2R WB 20 0 -20 -40 4R MC

0.010 0.005 0.000 -0.005

5R NT 60 40 20 0 6R TR 40 20 0 -20 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

-74.090 -74.095 -74.100 -74.105

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol IF 4

Plot file version 4 created 08-OCT-2002 16:41:32

1R EB

-10.885 -10.890 -10.895 -10.900

2R WB 0 -20 -40 -60 -80 4R MC

0.010 0.005 0.000 -0.005

5R NT -10 -20 -30 -40 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

-3.400 -3.405 -3.410 -3.415

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 16:41:44

1L EB

13.065 13.060 13.055 13.050 2L WB 70 60 50 4L MC

0.010 0.005 0.000 -0.005

5L NT 40 30 20 10 6L TR 100 80 60 40 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

49.430 49.425 49.420 49.415

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 16:41:49

1L EB 20 0 -20 2L WB 80 60 40 4L MC

0.010 0.005 0.000 -0.005

6L TR

-14.430 -14.435 -14.440 -14.445 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

150 100 50 0

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 16:48:02

1R EB 10 5 0 2R WB 5 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 0.4 0.2 0.0 -0.2 6R TR 15 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

5 0 -5

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 16:48:06

1R EB 10 5 0 -5 2R WB 5 0 -5 4R MC

0.010 0.005 0.000 -0.005

5R NT 0 -1 -2 -3 6R TR 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

8 6 4 2 0 -2

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 16:48:10

1R EB 10 5 0 2R WB 8 6 4 2 0 -2 4R MC

0.010 0.005 0.000 -0.005

5R NT 1 0 -1 6R TR 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

4 2 0

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Rpol IF 4

Plot file version 4 created 08-OCT-2002 16:48:14

1R EB 10 5 0 2R WB 5 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 1 0 -1 -2 -3 7R ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

8 6 4 2 0 -2

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 08-OCT-2002 16:48:18

1L EB 10 5 0 2L WB 10 5 0 4L MC

0.010 0.005 0.000 -0.005

5L NT 3 2 1 0 6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

10 5 0

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 16:48:22

1L EB 10 5 0 2L WB 86 42 0-2 4L MC

0.010 0.005 0.000 -0.005

5L NT 0.5 0.0 -0.5 -1.0 -1.5

6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

4 2 0 -2

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 16:48:26

1L EB 10 5 0 2L WB 5 0 4L MC

0.010 0.005 0.000 -0.005

5L NT 0.2 0.0 -0.2 -0.4

6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

6 4 2 0 -2

Gain phs vs UTC time for J1148+1840.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 16:48:30

1L EB 10 5 0 -5 2L WB 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

6L TR 10 5 0 7L ON

Degrees

TIME (HOURS)

18 20 30 40 50 19 00 10 20 30 40 50

5 0 -5 -10

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 16:54:44

1R EB 4 2 0 -2 2R WB 2 0 -2 4R MC

0.010 0.005 0.000 -0.005

5R NT 1 0 -1 -2 -3 6R TR 6 4 2 0 -2 -4 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

4 2 0 -2 -4

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 16:54:48

1R EB 2 0 -2 2R WB 2 1 0 -1 4R MC

0.010 0.005 0.000 -0.005

5R NT 2 0 -2 -4 6R TR 5 0 -5 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

2 0 -2

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 16:54:52

1R EB 2 0 -2 -4 2R WB 3 2 1 0 -1 4R MC

0.010 0.005 0.000 -0.005

5R NT 1.5 1.0 0.5 0.0 6R TR 5 0 7R ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

2 0 -2

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 16:55:04

1L EB 4 2 0 -2 2L WB 1 0 -1 -2 4L MC

0.010 0.005 0.000 -0.005

5L NT 3 2 1 0 -1 6L TR 86 42 0-2 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

4 20 -2-4 -6

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 16:55:08

1L EB 2 0 -2 2L WB 3 2 1 0 -1 4L MC

0.010 0.005 0.000 -0.005

5L NT 0 -2 -4 6L TR 8 6 4 2 0 -2 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

4 2 0 -2 -4

Gain phs vs UTC time for J1243+7442.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 16:55:12

1L EB 4 2 0 -2 -4 2L WB 4 2 0 -2 -4 4L MC

0.010 0.005 0.000 -0.005

5L NT

2.030 2.025 2.020 2.015

6L TR 5 0 7L ON

Degrees

TIME (HOURS)

17 18 19 20 21 22

5 0 -5 -10

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 16:57:29

1R EB 0 -2 -4 2R WB 10 0 -10 4R MC

0.010 0.005 0.000 -0.005

5R NT 5 0 6R TR 15 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

5 0 -5 -10 -15

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 16:57:33

1R EB 4 2 0 -2 2R WB 10 0 -10 4R MC

0.010 0.005 0.000 -0.005

5R NT 8 6 4 2 0 -2 6R TR 15 10 5 0 7R ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

10 0 -10

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 16:57:37

1R EB 3 2 1 0 -1 2R WB 10 5 0 -5 4R MC

0.010 0.005 0.000 -0.005

5R NT 6 4 2 0 -2 6R TR 15 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

6 4 2 0 -2 -4

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Rpol IF 4

Plot file version 4 created 08-OCT-2002 16:57:41

1R EB 2 0 -2 2R WB 10 0 -10 4R MC

0.010 0.005 0.000 -0.005

5R NT 4 2 0 -2 -4 7R ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

5 0 -5 -10 -15

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 08-OCT-2002 16:57:45

1L EB 4 2 0 -2 2L WB 10 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

10 5 0 -5

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 16:57:49

1L EB 4 2 0 -2 2L WB 10 0 -10 4L MC

0.010 0.005 0.000 -0.005

5L NT 6 4 2 0 -2 -4 6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

5 0 -5 -10 -15

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 16:57:53

1L EB 2 0 -2 2L WB 10 0 -10 4L MC

0.010 0.005 0.000 -0.005

5L NT 4 2 0 -2 6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

5 0 -5 -10 -15

Gain phs vs UTC time for J1319-1217.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 16:57:57

1L EB 2 0 -2 2L WB 10 0 -10 4L MC

0.010 0.005 0.000 -0.005

5L NT

-5.8 -5.9 -6.0

6L TR -1.5 -2.0 -2.5

7L ON

Degrees

TIME (HOURS)

19 10 20 30 40 50 20 00 10 20 30 40

5 0 -5 -10 -15

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 17:05:51

1R EB 5 0 -5 -10 2R WB 1 0 -1 4R MC

0.010 0.005 0.000 -0.005

5R NT 10 5 0 -5 6R TR 8 6 4 2 0 -2 7R ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

20 10 0

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 17:05:55

1R EB 5 0 -5 2R WB 4 2 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 10 5 0 6R TR 6 4 2 0 -2 7R ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

5 0 -5

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 08-OCT-2002 17:06:07

1L EB 5 0 -5 -10 2L WB 1 0 -1 -2 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 5 0 -5 7L ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

10 0 -10

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 17:06:11

1L EB 0 -5 -10 2L WB 2 0 -2 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 6 4 2 0 7L ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

5 0 -5 -10

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 17:06:15

1L EB 0 -5 -10 2L WB 2 0 -2 4L MC

0.010 0.005 0.000 -0.005

5L NT 5 0 -5 6L TR 4 2 0 -2 7L ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

5 0 -5 -10

Gain phs vs UTC time for J1359+4011.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 17:06:19

1L EB 5 0 -5 -10 2L WB 1 0 -1 -2 4L MC

0.010 0.005 0.000 -0.005

5L NT

-0.820 -0.825 -0.830 -0.835 6L TR 10 5 0 7L ON

Degrees

TIME (HOURS)

17 30 18 00 30 19 00 30 20 00 30 21 00

10 0 -10

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 08-OCT-2002 17:12:13

1R EB 10 5 0 2R WB 10 5 0 -5 4R MC

0.010 0.005 0.000 -0.005

5R NT 10 5 0 6R TR 10 0 -10 -20 7R ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

100 0 -100

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 08-OCT-2002 17:12:17

1R EB 10 5 0 -5 2R WB 10 5 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 10 5 0 6R TR 15 10 5 0 -5 7R ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

-20 -40 -60

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Rpol IF 3

Plot file version 3 created 08-OCT-2002 17:12:21

1R EB 10 5 0 -5 2R WB 10 5 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 10 0 -10 6R TR 15 10 5 0 7R ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

300 200 100

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Rpol IF 4

Plot file version 4 created 08-OCT-2002 17:12:25

1R EB 15 10 5 0 -5 2R WB 10 5 0 4R MC

0.010 0.005 0.000 -0.005

5R NT 15 10 5 0 7R ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

100 0 -100

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 08-OCT-2002 17:12:29

1L EB 10 5 0 -5 2L WB 10 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 10 5 0 -5 6L TR 15 10 5 0 -5 7L ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

0 -50 -100 -150

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Lpol IF 2

Plot file version 6 created 08-OCT-2002 17:12:33

1L EB 10 5 0 -5 2L WB 10 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 10 0 -10 6L TR 20 0 -20 7L ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

300 200 100

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Lpol IF 3

Plot file version 7 created 08-OCT-2002 17:12:37

1L EB 15 10 5 0 2L WB 15 10 5 0 -5 4L MC

0.010 0.005 0.000 -0.005

5L NT 15 10 5 0 6L TR 20 10 0 7L ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

50 0 -50 -100

Gain phs vs UTC time for J1400+0425.MULTI.1 SN 1 Lpol IF 4

Plot file version 8 created 08-OCT-2002 17:12:41

1L EB 10 5 0 -5 2L WB 10 0 -10 4L MC

0.010 0.005 0.000 -0.005

6L TR 20 10 0 -10 7L ON

Degrees

TIME (HOURS)

18 50 19 00 10 20 30 40 50 20 00 10

250 200 150 100 50