Center at RA 09 21 36.23108 DEC 62 15 52.1803

CONT: J0921+62 IPOL 4989.302 MHZ J0921+6215.ICL001.3

PLot file version 1 created 08-OCT-2002 16:39:31

Cont peak flux = 1.1616E+00 JY/BEAM Levs = 1.162E+00 * (-0.007, 0.007, 0.014, 0.028, 0.056, 0.112, 0.224, 0.448, 0.895)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100