Center at RA 11 48 37.77760 DEC 18 40 08.9830

CONT: J1148+18 IPOL 4989.302 MHZ J1148+1840.ICL001.3

PLot file version 1 created 08-OCT-2002 16:51:06

Cont peak flux = 4.1835E-01 JY/BEAM Levs = 4.184E-01 * (-0.014, 0.014, 0.028, 0.057, 0.114, 0.227, 0.454, 0.908)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100