Center at RA 12 43 45.03240 DEC 74 42 37.1270

CONT: J1243+74 IPOL 4989.302 MHZ J1243+7442.ICL001.3

PLot file version 1 created 08-OCT-2002 16:53:57

Cont peak flux = 3.6975E-01 JY/BEAM Levs = 3.698E-01 * (-0.010, 0.010, 0.020, 0.040, 0.079, 0.159, 0.318, 0.635)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100