Center at RA 13 19 12.07000 DEC -12 17 32.1000

CONT: J1319-12 IPOL 4989.302 MHZ J1319-1217.ICL001.3

PLot file version 1 created 08-OCT-2002 17:04:10

Cont peak flux = 4.1826E-01 JY/BEAM Levs = 4.183E-01 * (-0.013, 0.013, 0.026, 0.053, 0.105, 0.210, 0.421, 0.841)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100