Center at RA 13 59 38.09430 DEC 40 11 38.2600

CONT: J1359+40 IPOL 4989.302 MHZ J1359+4011.ICL001.3

PLot file version 1 created 08-OCT-2002 17:08:37

Cont peak flux = 3.0805E-01 JY/BEAM Levs = 3.081E-01 * (-0.018, 0.018, 0.036, 0.073, 0.146, 0.292, 0.584)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100