Tsys vs UTC time for ef009a.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 1 created 08-OCT-2002 16:17:03

1R EB IF 1

0.040 0.035 0.030

1R EB IF 2

0.040 0.035 0.030

1R EB IF 3

0.045 0.040 0.035 0.030

1R EB IF 4

0.045 0.040 0.035 0.030

2R WB IF 1

0.074 0.072 0.070

2R WB IF 2

Kilo Kelvin

0.074 0.072 0.070 0.068 2R WB IF 3

0.078 0.076 0.074 0.072

2R WB IF 4

0.076 0.074 0.072 0.070

3R JB IF 1 0.6 0.4 0.2 0.0 3R JB IF 2

TIME (HOURS)

16 17 18 19 20 21 22 23

0.6 0.4 0.2 0.0

Tsys vs UTC time for ef009a.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 2 created 08-OCT-2002 16:17:03

3R JB IF 3 0.3 0.2 0.1 0.0 3R JB IF 4 0.8 0.6 0.4 0.2 0.0 4R MC IF 1

0.060 0.055 0.050

4R MC IF 2

0.065 0.060 0.055 0.050

4R MC IF 3

0.065

0.060

0.055

4R MC IF 4

Kilo Kelvin

0.065 0.060 0.055

5R NT IF 1

0.046 0.044 0.042 0.040

5R NT IF 2

0.055 0.050 0.045 0.040

5R NT IF 3

0.048 0.046 0.044 0.042 0.040

5R NT IF 4

TIME (HOURS)

16 17 18 19 20 21 22 23

0.046 0.044 0.042 0.040

Tsys vs UTC time for ef009a.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 3 created 08-OCT-2002 16:17:03

6R TR IF 1

0.12 0.10 0.08 0.06 0.04 0.02 6R TR IF 2

0.15 0.10 0.05

6R TR IF 3 0.8 0.6 0.4 0.2 0.0 6R TR IF 4 0.3 0.2 0.1 7R ON IF 1

0.09 0.08 0.07

7R ON IF 2

Kilo Kelvin

0.09 0.08 0.07

7R ON IF 3

0.09 0.08 0.07

7R ON IF 4

TIME (HOURS)

16 17 18 19 20 21 22 23

0.09 0.08 0.07

Tsys vs UTC time for ef009a.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 4 created 08-OCT-2002 16:17:07

1L EB IF 1 40 35 30 1L EB IF 2 40 35 30 1L EB IF 3 50 40 30 1L EB IF 4 50 40 30 2L WB IF 1 74 72 70 2L WB IF 2

Kelvin

74 72 70 68 2L WB IF 3 78 76 74 72 2L WB IF 4 76 74 72 70 3L JB IF 1 800 600 400 200 0 3L JB IF 2

TIME (HOURS)

16 17 18 19 20 21 22 23

100 80 60 40

Tsys vs UTC time for ef009a.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 5 created 08-OCT-2002 16:17:07

3L JB IF 3 600 400 200 0 3L JB IF 4 400 200 0 4L MC IF 1 65 60 55 50 45 4L MC IF 2 65 60 55 50 45 4L MC IF 3 65 60 55 4L MC IF 4

Kelvin

60 55 5L NT IF 1 48 46 44 42 5L NT IF 2 50 48 46 44 5L NT IF 3 50 48 46 44 42 5L NT IF 4

TIME (HOURS)

16 17 18 19 20 21 22 23

48 46 44 42

Tsys vs UTC time for ef009a.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 6 created 08-OCT-2002 16:17:07

6L TR IF 1 200 150 100 50 6L TR IF 2 200 100 0 6L TR IF 3 600 400 200 0 6L TR IF 4 400 300 200 100 7L ON IF 1 80 70 60 7L ON IF 2

Kelvin

80 70 60 7L ON IF 3 80 70 60 7L ON IF 4

TIME (HOURS)

16 17 18 19 20 21 22 23

80 70 60