Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 21-JUN-2005 11:24:09

1 EB IF 1R

0.010 0.005 0.000 -0.005

1 EB IF 1L

0.010 0.005 0.000 -0.005

1 EB IF 2R

0.010 0.005 0.000 -0.005

1 EB IF 2L

0.010 0.005 0.000 -0.005

1 EB IF 3R

0.010 0.005 0.000 -0.005

1 EB IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EB IF 4R

0.010 0.005 0.000 -0.005

1 EB IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 1R 0.0 -0.5 -1.0

2 WB IF 1L

TIME (HOURS)

17 18 19 20 21 22

0.5 0.0 -0.5 -1.0

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 21-JUN-2005 11:24:09

2 WB IF 2R 1.5 1.0 0.5 0.0 2 WB IF 2L 1.5 1.0 0.5 0.0 2 WB IF 3R 1 0 -1 2 WB IF 3L 0.5 0.0 -0.5 -1.0 2 WB IF 4R 1 0 -1 2 WB IF 4L

Degrees

0.5 0.0 -0.5 -1.0 4 MC IF 1R 2 1 0 4 MC IF 1L 2 1 0 -1 4 MC IF 2R 1 0 -1 4 MC IF 2L

TIME (HOURS)

17 18 19 20 21 22

2 0 -2

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 21-JUN-2005 11:24:09

4 MC IF 3R 2 1 0 4 MC IF 3L 3 2 1 0 -1 4 MC IF 4R 3 2 1 0 4 MC IF 4L 1.0 0.5 0.0 -0.5

5 NT IF 1R 2 1 0 5 NT IF 1L

Degrees

2.895 2.890 2.885 2.880

5 NT IF 2L 2.5 2.0 1.5 1.0 0.5 5 NT IF 3R 1.5 1.0 0.5 0.0 -0.5

5 NT IF 3L

2.005 2.000 1.995 1.990

5 NT IF 4R

TIME (HOURS)

17 18 19 20 21 22

1.7 1.6 1.5

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 21-JUN-2005 11:24:09

6 TR IF 1R 0.0 -0.5 -1.0 -1.5 6 TR IF 1L 0 -50 -100

6 TR IF 2R 2 0 -2 6 TR IF 2L 0 -5 -10 -15 6 TR IF 3R 1 0 -1 -2 6 TR IF 3L

Degrees

0 -20 -40 6 TR IF 4R 2 0 -2 6 TR IF 4L 5 0 -5 7 ON IF 1R 4 2 0 7 ON IF 1L

TIME (HOURS)

17 18 19 20 21 22

3 2 1 0

Gain phs vs UTC time for J0921+6215.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 21-JUN-2005 11:24:09

7 ON IF 2R 1 0 -1 7 ON IF 2L 4 2 0 -2 7 ON IF 3R 1.5 1.0 0.5 0.0 -0.5

7 ON IF 3L 1.5 1.0 0.5 0.0 -0.5

7 ON IF 4R 4 2 0 -2 7 ON IF 4L

Degrees

1.0 0.5 0.0 -0.5

8 RO IF 1L 100 50 0 8 RO IF 2L 0 -50 -100 -150

8 RO IF 3L 40 20 0 8 RO IF 4L

TIME (HOURS)

17 18 19 20 21 22

350 300 250 200