Center at RA 09 21 36.23108 DEC 62 15 52.1803

CONT: J0921+62 IPOL 1652.896 MHZ J0921+6215.ICL001.5

PLot file version 1 created 21-JUN-2005 11:25:12

Cont peak flux = 9.3028E-01 JY/BEAM Levs = 9.303E-01 * (-0.010, 0.010, 0.021, 0.042, 0.084, 0.168, 0.335, 0.670)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250