Gain amp vs UTC time for J1120+5404.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 21-JUN-2005 11:22:20

1 EB IF 1R

1.12 1.10 1.08

1 EB IF 1L 1.2 1.1 1.0 1 EB IF 2R

1.10

1.05

1.00 1 EB IF 2L

1.05

1.00

0.95 1 EB IF 3R

1.05

1.00

0.95 1 EB IF 3L

Gain

0.95 0.90 0.85 0.80 1 EB IF 4R 1.1 1.0 0.9 1 EB IF 4L

1.05 1.00 0.95

2 WB IF 1R

1.02 1.00 0.98 0.96 0.94 2 WB IF 1L

TIME (HOURS)

18 19 20 21 22 23

0.95

0.90

Gain amp vs UTC time for J1120+5404.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 21-JUN-2005 11:22:20

2 WB IF 2R

1.15 1.10 1.05 1.00

2 WB IF 2L

1.10

1.05

1.00

2 WB IF 3R

0.98 0.96 0.94 0.92 0.90 0.88 2 WB IF 3L 1.2 1.0 0.8 2 WB IF 4R

1.04 1.02 1.00 0.98 0.96

2 WB IF 4L

Gain

1.06 1.04 1.02 1.00 0.98

3 JB IF 1R

0.916 0.914 0.912 0.910 0.908

3 JB IF 1L 1.3 1.2 1.1 1.0 3 JB IF 2R

1.05 1.00 0.95 0.90 0.85

3 JB IF 2L

TIME (HOURS)

18 19 20 21 22 23

1.28 1.26 1.24 1.22 1.20

Gain amp vs UTC time for J1120+5404.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 21-JUN-2005 11:22:20

3 JB IF 3R

1.04 1.03 1.02 1.01

3 JB IF 3L 1.6 1.5 1.4 1.3 3 JB IF 4R 1.0 0.9 0.8 3 JB IF 4L

0.90

0.85

0.80

4 MC IF 1L

0.670 0.665 0.660 0.655 4 MC IF 2L

Gain

0.585 0.580 0.575 0.570 4 MC IF 3R

0.545 0.540 0.535 0.530 4 MC IF 3L

1.185 1.180 1.175 1.170

6 TR IF 1L

1.190 1.185 1.180 1.175

6 TR IF 3L

TIME (HOURS)

18 19 20 21 22 23

1.040 1.035 1.030 1.025

Gain amp vs UTC time for J1120+5404.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 21-JUN-2005 11:22:20

7 ON IF 1L 1.2 1.1 1.0 7 ON IF 2R 0.9 0.8 0.7 7 ON IF 2L

0.96 0.95 0.94 0.93

7 ON IF 3R

1.140 1.135 1.130 1.125 7 ON IF 3L

1.005 1.000 0.995 0.990 7 ON IF 4L

Gain

TIME (HOURS)

18 19 20 21 22 23

1.080 1.075 1.070 1.065