Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 21-JUN-2005 11:22:14

1 EB IF 1R

0.010 0.005 0.000 -0.005

1 EB IF 1L

0.010 0.005 0.000 -0.005

1 EB IF 2R

0.010 0.005 0.000 -0.005

1 EB IF 2L

0.010 0.005 0.000 -0.005

1 EB IF 3R

0.010 0.005 0.000 -0.005

1 EB IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EB IF 4R

0.010 0.005 0.000 -0.005

1 EB IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 1R 5 0 -5 2 WB IF 1L

TIME (HOURS)

18 19 20 21 22 23

100 50 0

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 21-JUN-2005 11:22:14

2 WB IF 2R 15 10 5 0 -5 2 WB IF 2L 80 60 40 20 0 2 WB IF 3R 5 0 -5 2 WB IF 3L 60 40 20 0 2 WB IF 4R 4 2 0 -2 2 WB IF 4L

Degrees

150 100 50 0 3 JB IF 1R 20 10 0 -10 3 JB IF 1L 0 -50 -100

3 JB IF 2R 150 100 50 0 3 JB IF 2L

TIME (HOURS)

18 19 20 21 22 23

100 50 0 -50

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 21-JUN-2005 11:22:14

3 JB IF 3R 0 -50 -100

3 JB IF 3L 50 0 -50 3 JB IF 4R 20 0 -20 -40 -60 -80 3 JB IF 4L 50 0 -50 4 MC IF 1R 250 200 150 4 MC IF 1L

Degrees

-41.655 -41.660 -41.665 -41.670 4 MC IF 2R 320 300 280 260 240 220 4 MC IF 2L 0 -20 -40 -60 -80 4 MC IF 3R

116.690 116.685 116.680 116.675 4 MC IF 3L

TIME (HOURS)

18 19 20 21 22 23

11.110 11.105 11.100 11.095

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 21-JUN-2005 11:22:14

4 MC IF 4R 100 50 0 -50 5 NT IF 1L

-26.505 -26.510 -26.515 -26.520

5 NT IF 3R

-86.860 -86.865 -86.870 -86.875

5 NT IF 3L

-124.550 -124.555 -124.560 -124.565 6 TR IF 1R

158.440 158.435 158.430 158.425

6 TR IF 1L

Degrees

175 170 165 6 TR IF 2L

116.455 116.450 116.445 116.440

6 TR IF 3L

168.410 168.405 168.400 168.395

6 TR IF 4R

123.185 123.180 123.175 123.170

6 TR IF 4L

TIME (HOURS)

18 19 20 21 22 23

83.335 83.330 83.325 83.320

Gain phs vs UTC time for J1120+5404.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 21-JUN-2005 11:22:14

7 ON IF 1R

32.490 32.485 32.480 32.475

7 ON IF 1L 200 150 100 7 ON IF 2R 0 -100

-200

7 ON IF 2L 80 60 40 20 7 ON IF 3R 0 -50 -100

7 ON IF 3L

Degrees

344 342 340 7 ON IF 4R 300 200 100 7 ON IF 4L

TIME (HOURS)

18 19 20 21 22 23

60 40 20 0