Center at RA 11 20 23.22860 DEC 54 04 27.0900

CONT: J1120+54 IPOL 1652.896 MHZ J1120+5404.ICL001.5

PLot file version 1 created 21-JUN-2005 11:24:30

Cont peak flux = 3.2989E-02 JY/BEAM Levs = 3.299E-02 * (-0.030, 0.030, 0.060, 0.120, 0.239, 0.478, 0.957)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250