Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 21-JUN-2005 11:22:48

1 EB IF 1R

0.010 0.005 0.000 -0.005

1 EB IF 1L

0.010 0.005 0.000 -0.005

1 EB IF 2R

0.010 0.005 0.000 -0.005

1 EB IF 2L

0.010 0.005 0.000 -0.005

1 EB IF 3R

0.010 0.005 0.000 -0.005

1 EB IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EB IF 4R

0.010 0.005 0.000 -0.005

1 EB IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 1R

-0.555 -0.560 -0.565 -0.570

2 WB IF 1L

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

-2.160 -2.165 -2.170 -2.175

Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 21-JUN-2005 11:22:48

2 WB IF 2R

0.625 0.620 0.615 0.610

2 WB IF 2L

1.115 1.110 1.105 1.100 2 WB IF 3R

-0.115 -0.120 -0.125 -0.130 2 WB IF 3L

0.410 0.405 0.400 0.395 2 WB IF 4R

-0.830 -0.835 -0.840 -0.845 2 WB IF 4L

Degrees

1.505 1.500 1.495 1.490

3 JB IF 1R

1.235 1.230 1.225 1.220 3 JB IF 1L

1.025 1.020 1.015 1.010

3 JB IF 2R

-2.100 -2.105 -2.110 -2.115

3 JB IF 2L

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

-0.830 -0.835 -0.840 -0.845

Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 21-JUN-2005 11:22:48

3 JB IF 3R

-0.515 -0.520 -0.525 -0.530 3 JB IF 3L

1.330 1.325 1.320 1.315 3 JB IF 4R

-0.320 -0.325 -0.330 -0.335

3 JB IF 4L

0.285 0.280 0.275 0.270 4 MC IF 1R

-0.460 -0.465 -0.470 -0.475

4 MC IF 1L

Degrees

-0.435 -0.440 -0.445 -0.450

4 MC IF 2R

1.955 1.950 1.945 1.940 4 MC IF 2L

0.300 0.295 0.290 0.285

4 MC IF 3R

-1.120 -1.125 -1.130 -1.135 4 MC IF 3L

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

-1.085 -1.090 -1.095 -1.100

Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 21-JUN-2005 11:22:48

4 MC IF 4R

-0.980 -0.985 -0.990 -0.995 4 MC IF 4L

-1.065 -1.070 -1.075 -1.080

5 NT IF 1R

2.745 2.740 2.735 2.730 5 NT IF 1L

-0.115 -0.120 -0.125 -0.130

5 NT IF 3R

1.095 1.090 1.085 1.080

6 TR IF 1R

Degrees

-0.520 -0.525 -0.530 -0.535

6 TR IF 1L

-1.530 -1.535 -1.540 -1.545

6 TR IF 2R

-2.280 -2.285 -2.290 -2.295

6 TR IF 2L

2.840 2.835 2.830 2.825

6 TR IF 3R

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

-1.695 -1.700 -1.705 -1.710

Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 21-JUN-2005 11:22:48

6 TR IF 3L

3.140 3.135 3.130 3.125

6 TR IF 4R

-1.240 -1.245 -1.250 -1.255

6 TR IF 4L

0.320 0.315 0.310 0.305

7 ON IF 1R

1.285 1.280 1.275 1.270

7 ON IF 1L

-1.120 -1.125 -1.130 -1.135

7 ON IF 2R

Degrees

-0.325 -0.330 -0.335 -0.340

7 ON IF 2L

-0.790 -0.795 -0.800 -0.805

7 ON IF 3R

2.815 2.810 2.805 2.800

7 ON IF 3L

-0.590 -0.595 -0.600 -0.605

7 ON IF 4R

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

-2.170 -2.175 -2.180 -2.185

Gain phs vs UTC time for J1238+0723.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 21-JUN-2005 11:22:48

7 ON IF 4L

-0.455 -0.460 -0.465 -0.470

8 RO IF 1L

2.525 2.520 2.515 2.510

8 RO IF 2L

-0.600 -0.605 -0.610 -0.615

8 RO IF 3L

Degrees

TIME (HOURS)

20 16 29.5 30.0 30.5 31.0

0.330 0.325 0.320 0.315