Center at RA 12 43 45.03240 DEC 74 42 37.1270

CONT: J1243+74 IPOL 1652.896 MHZ J1243+7442.ICL001.5

PLot file version 1 created 21-JUN-2005 11:24:47

Cont peak flux = 2.9477E-01 JY/BEAM Levs = 2.948E-01 * (-0.009, 0.009, 0.018, 0.036, 0.071, 0.143, 0.286, 0.572)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250