Center at RA 14 00 48.44340 DEC 04 25 30.8740

CONT: J1400+04 IPOL 1652.896 MHZ J1400+0425.ICL001.5

PLot file version 1 created 21-JUN-2005 11:25:05

Cont peak flux = 1.3687E-01 JY/BEAM Levs = 1.369E-01 * (-0.007, 0.007, 0.015, 0.029, 0.059, 0.118, 0.235, 0.470, 0.941)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250