Center at RA 13 10 28.66385 DEC 32 20 43.7830

CONT: 1308+326 IPOL 4988.365 MHZ 1308+326.ICL001.4

PLot file version 1 created 06-MAR-2003 13:34:25

Cont peak flux = 2.1712E-02 JY/BEAM Levs = 2.171E-02 * (-0.023, 0.023, 0.047, 0.093, 0.186, 0.372, 0.745)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100