Center at RA 18 00 45.68392 DEC 78 28 04.0185

CONT: 1803+784 IPOL 4988.365 MHZ 1803+784.ICL001.4

PLot file version 1 created 06-MAR-2003 13:43:08

Cont peak flux = 1.6608E+00 JY/BEAM Levs = 1.661E+00 * (-0.012, 0.012, 0.024, 0.049, 0.097, 0.194, 0.388, 0.776)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100