Center at RA 19 36 27.81666 DEC 36 42 34.9807

CONT: J1936+36 IPOL 4988.365 MHZ J1936+3642.ICL001.4

PLot file version 1 created 06-MAR-2003 13:18:42

Cont peak flux = 9.4041E-02 JY/BEAM Levs = 9.404E-02 * (-0.020, 0.020, 0.039, 0.078, 0.156, 0.312, 0.624)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100