Center at RA 19 36 27.81666 DEC 36 42 34.9807

CONT: J1936+36 IPOL 4988.365 MHZ J1936+3642.IIM001.2

PLot file version 1 created 06-MAR-2003 12:13:34

Cont peak flux = 8.1391E-02 JY/BEAM Levs = 8.139E-02 * (-0.139, 0.139, 0.277, 0.554)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100

Center at RA 19 36 27.81666 DEC 36 42 34.9807

CONT: J1936+36 IPOL 4988.365 MHZ J1936+3642.IIM001.2

PLot file version 1 created 06-MAR-2003 12:18:30

Cont peak flux = 8.1391E-02 JY/BEAM Levs = 8.139E-02 * (-0.139, 0.139, 0.277, 0.554)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100

Center at RA 19 36 27.81666 DEC 36 42 34.9807

CONT: J1936+36 IPOL 4988.365 MHZ J1936+3642.IIM001.2

PLot file version 1 created 06-MAR-2003 12:24:24

Cont peak flux = 8.1391E-02 JY/BEAM Levs = 8.139E-02 * (-0.139, 0.139, 0.277, 0.554)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100

Center at RA 19 36 27.81666 DEC 36 42 34.9807

CONT: J1936+36 IPOL 4988.365 MHZ J1936+3642.IIM001.2

PLot file version 1 created 06-MAR-2003 13:17:49

Cont peak flux = 8.1391E-02 JY/BEAM Levs = 8.139E-02 * (-0.139, 0.139, 0.277, 0.554)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100