Center at RA 19 45 15.92280 DEC 09 52 59.5639

CONT: J1945+09 IPOL 4988.365 MHZ J1945+0952.IIM001.2

PLot file version 1 created 06-MAR-2003 12:25:20

Cont peak flux = 1.7938E-01 JY/BEAM Levs = 1.794E-01 * (-0.152, 0.152, 0.304, 0.608)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100

Center at RA 19 45 15.92280 DEC 09 52 59.5639

CONT: J1945+09 IPOL 4988.365 MHZ J1945+0952.IIM001.2

PLot file version 1 created 06-MAR-2003 13:18:58

Cont peak flux = 1.7938E-01 JY/BEAM Levs = 1.794E-01 * (-0.152, 0.152, 0.304, 0.608)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100