Center at RA 01 36 58.59481 DEC 47 51 29.1000

CONT: 0133+476 IPOL 4989.302 MHZ 0133+476.ICL001.3

PLot file version 1 created 01-FEB-2003 17:32:37

Cont peak flux = 3.7068E+00 JY/BEAM Levs = 3.707E+00 * (-0.015, 0.015, 0.029, 0.058, 0.116, 0.233, 0.465, 0.930)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100