Center at RA 17 28 18.62385 DEC 50 13 10.4700

CONT: 1728+502 IPOL 4989.771 MHZ 1728+502.ICL001.3

PLot file version 1 created 12-MAR-2003 16:15:28

Cont peak flux = 1.2968E-01 JY/BEAM Levs = 1.297E-01 * (-0.003, 0.003, 0.006, 0.013, 0.025, 0.050, 0.100, 0.201, 0.401, 0.803)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100