Center at RA 17 28 18.62385 DEC 50 13 10.4700

CONT: 1728+502 IPOL 4989.771 MHZ 1728+502.IIM001.2

PLot file version 1 created 12-MAR-2003 16:11:19

Cont peak flux = 1.0421E-01 JY/BEAM Levs = 1.042E-01 * (-0.137, 0.137, 0.275, 0.550)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100