Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-MAR-2003 15:53:38

2L EB

1010 1000 990 980 4L MC 1000 950 900 5L NT 960 940 920 900 6L ON 1000 950 900 7L SH

1100 1050 1000 950 8L TR

MilliGain

1020 1000 980 9L WB

1000 980 960 10L UR

TIME (HOURS)

16 17 18 19 20 21 22 23

1000 950 900 850

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-MAR-2003 15:53:38

2L EB

1010

1000 990 4L MC

1020 1000 980 960 940 920 5L NT

1180 1160 1140 1120 1100

6L ON

1000 950 900 7L SH

1050

1000 950 8L TR

MilliGain

990 980 970 960 950 9L WB

1030 1020 1010 1000 990 10L UR

TIME (HOURS)

16 17 18 19 20 21 22 23

1050 1000 950 900

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-MAR-2003 15:53:38

2L EB

1060 1040 1020 1000 980 4L MC

1000 950 900 5L NT 920 900 880 6L ON

1050 1000 950 900 7L SH

1050 1000 950 900 850 8L TR

MilliGain

1000 980 960 940 9L WB

1000 980 960 940 10L UR

TIME (HOURS)

16 17 18 19 20 21 22 23

1050 1000 950 900 850

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-MAR-2003 15:53:38

1L CM 2.4 2.2 2.0 1.8 1.6 2L EB

1.08 1.06 1.04 1.02

4L MC

1.00 0.98 0.96 0.94 0.92 5L NT

0.96 0.94 0.92 6L ON

1.05 1.00 0.95 0.90 7L SH

Gain

1.05 1.00 0.95

8L TR

0.94 0.92 0.90

9L WB

TIME (HOURS)

16 17 18 19 20 21 22 23

1.00 0.98 0.96 0.94

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 5

Plot file version 5 created 12-MAR-2003 15:53:39

1L CM

1400

1200

1000

2L EB

1040 1020 1000 980 960 4L MC

1000 980 960 940 920 5L NT

1020 1000 980 960 6L ON

1050 1000 950 900 7L SH

MilliGain

1050 1000 950 900 850 8L TR 960 940 920 9L WB

1000 980 960 940 10L UR

TIME (HOURS)

16 17 18 19 20 21 22 23

1000 950 900

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 6

Plot file version 6 created 12-MAR-2003 15:53:39

2L EB

1000 980 960 940 4L MC

1000 950 900 5L NT 980 960 940 920 6L ON

1050 1000 950 7L SH

1100

1000 900 8L TR

MilliGain

960 940 920 9L WB 980 960 940 10L UR

TIME (HOURS)

16 17 18 19 20 21 22 23

1050 1000 950 900 850

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 7

Plot file version 7 created 12-MAR-2003 15:53:39

2L EB

1040 1020 1000

4L MC 980 960 940 5L NT

1150 1100 1050

6L ON

1060 1040 1020 1000 980 960 7L SH

1030 1020 1010 1000 990 9L WB

MilliGain

TIME (HOURS)

16 17 18 19 20 21 22 23

1020 1000 980 960

Gain amp vs UTC time for OQ208.MULTI.1

SN 2 Lpol IF 8

Plot file version 8 created 12-MAR-2003 15:53:39

2L EB 990 980 970 960 950 4L MC

1000 980 960 940 920 5L NT

1150

1100

1050

6L ON

1020 1000 980 960 940 920 7L SH

1060 1040 1020 1000 980 960 8L TR

MilliGain

1000 980 960 940 9L WB

TIME (HOURS)

16 17 18 19 20 21 22 23

980 960 940

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-MAR-2003 15:54:49

2L EB

1050

1000 950 4L MC

1000 950 900 850 5L NT

1100 1000 900 800 700 6L ON

1400 1200 1000

8L TR

1150 1100 1050 1000

9L WB

MilliGain

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1100

1000 900

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-MAR-2003 15:54:49

2L EB

1060 1040 1020 1000980 960 4L MC

1050 1000 950 900 5L NT

1300 1200 1100 1000 900 6L ON

1200 1100 1000 900 8L TR

1060 1040 1020 1000 980960

9L WB

MilliGain

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1150 1100 1050 1000 950

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-MAR-2003 15:54:49

2L EB

1050 1000 950 900 4L MC

1000 900 800 5L NT 900 880 860 840 820 6L ON

1040 1020 1000 980 960 940 8L TR

1150 1100 1050 1000 950 9L WB

MilliGain

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1050 1000 950

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-MAR-2003 15:54:50

1L CM 3 2 1 2L EB

1.06 1.04 1.02 1.00

4L MC

1.05 1.00 0.95 0.90 0.85

5L NT

1.00 0.95 0.90 0.85

6L ON 1.3 1.2 1.1 1.0 8L TR

Gain

1.00 0.95 0.90

9L WB

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1.05

1.00

0.95

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 7

Plot file version 7 created 12-MAR-2003 15:54:50

2L EB

1.10

1.05

1.00 4L MC 1.1 1.0 0.9 0.8 5L NT 3 2 1 6L ON 1.05 1.00

9L WB

Gain

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1.06 1.04 1.02 1.00 0.98 0.96

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 8

Plot file version 8 created 12-MAR-2003 15:54:51

2L EB 1.00 0.98 0.96 4L MC 1.1 1.0 0.9 0.8 5L NT 5 4 3 2 1 6L ON 1.4 1.2 1.0 8L TR 1.1 1.0 0.9 9L WB

Gain

TIME (HOURS)

15 16 17 18 19 20 21 22 23

1.05

1.00

0.95

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-MAR-2003 15:58:12

2L EB 4 3 2 1 4L MC 1.0 0.9 0.8 0.7 5L NT 3 2 1 6L ON 1.0 0.9 0.8 7L SH 1.6 1.4 1.2 1.0 0.8 8L TR

Gain

1.1 1.0 0.9 0.8 9L WB 1.1 1.0 0.9 0.8 10L UR

TIME (HOURS)

14 16 18 20 22 1/00

1.81.6 1.41.2 1.00.8

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-MAR-2003 15:58:12

2L EB 4 3 2 1 4L MC 1.0 0.9 0.8 5L NT 3 2 1 6L ON 1.0 0.9 0.8 7L SH 1.6 1.4 1.2 1.0 0.8 8L TR

Gain

1.1 1.0 0.9 0.8 9L WB 1.1 1.0 0.9 10L UR

TIME (HOURS)

14 16 18 20 22 1/00

8 6 4 2

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-MAR-2003 15:58:12

2L EB 6 4 2 4L MC 1.0 0.9 0.8 5L NT 3 2 1 6L ON

1.05 1.00 0.95 0.90 0.85 7L SH 1.4 1.2 1.0 0.8 8L TR

Gain

1.1 1.0 0.9 0.8 9L WB 1.1 1.0 0.9 0.8 10L UR

TIME (HOURS)

14 16 18 20 22 1/00

2.0 1.5 1.0

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-MAR-2003 15:58:12

1L CM 8 6 4 2 2L EB 5 4 3 2 1 4L MC 1.0 0.9 0.8 5L NT 3 2 1 6L ON 1.1 1.0 0.9 7L SH

Gain

1.6 1.4 1.2 1.0 0.8 8L TR 1.6 1.4 1.2 1.0 0.8 9L WB

TIME (HOURS)

14 16 18 20 22 1/00

1.1 1.0 0.9

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 5

Plot file version 5 created 12-MAR-2003 15:58:12

1L CM 8 6 4 2 2L EB 4 3 2 1 4L MC 1.0 0.9 0.8 5L NT 3 2 1 6L ON 1.1 1.0 0.9 7L SH

Gain

1.6 1.4 1.2 1.0 0.8 8L TR 1.0 0.9 0.8 0.7 9L WB 1.1 1.0 0.9 10L UR

TIME (HOURS)

14 16 18 20 22 1/00

2.0 1.5 1.0

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 6

Plot file version 6 created 12-MAR-2003 15:58:13

2L EB 4 3 2 1 4L MC 1.0 0.9 0.8 5L NT 100 50 0 6L ON 1.1 1.0 0.9 7L SH 1.4 1.2 1.0 0.8 8L TR

Gain

3 2 1 9L WB 10 5 0 10L UR

TIME (HOURS)

14 16 18 20 22 1/00

2.0 1.5 1.0

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 7

Plot file version 7 created 12-MAR-2003 15:58:13

2L EB 30 20 10 0 4L MC 1.0 0.9 0.8 0.7 5L NT 40 20 0 6L ON 1.1 1.0 0.9 7L SH 1.6 1.4 1.2 1.0 0.8 9L WB

Gain

TIME (HOURS)

14 16 18 20 22 1/00

15 10 5 0

Gain amp vs UTC time for 1215+303.MULTI.1 SN 2 Lpol IF 8

Plot file version 8 created 12-MAR-2003 15:58:13

2L EB 4 3 2 1 4L MC 1.0 0.9 0.8 0.7 5L NT 6 4 2 0 6L ON 1.2 1.1 1.0 0.9 7L SH 1.2 1.0 0.8 8L TR

Gain

1.0 0.9 0.8 9L WB

TIME (HOURS)

14 16 18 20 22 1/00

1.1 1.0 0.9

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-MAR-2003 16:13:45

2L EB

1200 1100 1000

4L MC

1200 1100 1000 900 5L NT

1200 1000 800 6L ON 1200 1000 800 7L SH

1000 800 600 8L TR

MilliGain

1050 1000 950 900 9L WB 950 900 850 10L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1200 1000 800

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-MAR-2003 16:13:46

2L EB 1.2 1.1 1.0 4L MC 1.2 1.0 0.8 5L NT 1.6 1.4 1.2 1.0 6L ON 1.4 1.2 1.0 0.8 7L SH 2.0 1.5 1.0 0.5 8L TR

Gain

1.1 1.0 0.9 0.8 9L WB 1.0 0.9 0.8 10L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.2 1.0 0.8

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-MAR-2003 16:13:46

2L EB

1.10 1.05 1.00 0.95

4L MC 1.1 1.0 0.9 0.8 5L NT 1.2 1.0 0.8 6L ON 2.0 1.5 1.0 7L SH 1.2 1.0 0.8 0.6 8L TR

Gain

1.0 0.9 0.8 9L WB

1.00 0.95 0.90

10L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.2 1.0 0.8

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 6

Plot file version 6 created 12-MAR-2003 16:13:46

2L EB 1.1 1.0 0.9 4L MC 1.2 1.0 0.8 5L NT 1.4 1.2 1.0 0.8 6L ON 1.2 1.0 0.8 7L SH 1.5 1.0 0.5 8L TR

Gain

1.0 0.9 0.8 0.7 9L WB

0.95 0.90 0.85 0.80 10L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 7

Plot file version 7 created 12-MAR-2003 16:13:47

2L EB 1.2 1.1 1.0 4L MC 1.3 1.2 1.1 1.0 0.9 5L NT 2.0 1.5 1.0 6L ON 1.3 1.2 1.1 1.0 0.9 7L SH 3 2 1 9L WB

Gain

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.0 0.9 0.8

Gain amp vs UTC time for 1728+502.MULTI.1 SN 2 Lpol IF 8

Plot file version 8 created 12-MAR-2003 16:13:47

2L EB 1.1 1.0 0.9 4L MC 1.2 1.1 1.0 0.9 5L NT 1.6 1.4 1.2 1.0 0.8 6L ON 1.4 1.2 1.0 0.8 7L SH 1.4 1.2 1.0 0.8 0.6 8L TR

Gain

1.05 1.00 0.95 0.90 0.85

9L WB

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.00 0.95 0.90