Center at RA 14 07 00.39441 DEC 28 27 14.6900

CONT: OQ208 IPOL 4989.771 MHZ OQ208.ICL001.3

PLot file version 1 created 12-MAR-2003 15:53:59

Cont peak flux = 2.1417E+00 JY/BEAM Levs = 2.142E+00 * (-0.010, 0.010, 0.020, 0.039, 0.079, 0.158, 0.316, 0.631)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100