Center at RA 05 18 05.14246 DEC 33 06 13.3646

CONT: J0518+33 IPOL 6667.700 MHZ J0518+3306.IIM001.1

PLot file version 1 created 20-MAR-2005 16:32:25

Cont peak flux = 1.8959E-01 JY/BEAM Levs = 1.896E-01 * (-0.129, 0.129, 0.258, 0.515)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100