Center at RA 15 32 46.34518 DEC 23 44 05.5709

CONT: B1530+23 IPOL 1681.470 MHZ B1530+235.ICL001.5

PLot file version 1 created 11-NOV-2004 18:32:11

Cont peak flux = 1.4043E-01 JY/BEAM Levs = 1.404E-01 * (-0.013, 0.013, 0.027, 0.054, 0.108, 0.215, 0.431, 0.862)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250