Center at RA 15 16 56.79619 DEC 19 32 12.9919

CONT: J1516+19 IPOL 1681.470 MHZ J1516+193.ICL001.5

PLot file version 1 created 11-NOV-2004 18:32:33

Cont peak flux = 2.4964E-01 JY/BEAM Levs = 2.496E-01 * (-0.008, 0.008, 0.016, 0.032, 0.065, 0.129, 0.259, 0.517)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250