Center at RA 16 13 41.06425 DEC 34 12 47.9091

CONT: J1613+34 IPOL 1681.470 MHZ J1613+341.ICL001.5

PLot file version 1 created 11-NOV-2004 18:32:24

Cont peak flux = 5.2849E+00 JY/BEAM Levs = 5.285E+00 * (-0.008, 0.008, 0.016, 0.032, 0.063, 0.126, 0.252, 0.505)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250