Center at RA 17 33 02.70578 DEC -13 04 49.5483

CONT: NRAO530 IPOL 6667.300 MHZ NRAO530.IIM001.2

PLot file version 1 created 17-MAR-2005 12:11:14

Cont peak flux = 2.9036E+00 JY/BEAM Levs = 2.904E+00 * (-0.164, 0.164, 0.327, 0.654)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100