Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 30-AUG-2005 15:47:57

1 JB IF 1R 100 0 -100

1 JB IF 1L 200 100 0 -100

1 JB IF 2R 100 0 -100 1 JB IF 2L 20 0 -20 -40 -60 1 JB IF 3R 150 100 50 0 1 JB IF 3L

Degrees

50 0 -50 -100

1 JB IF 4R 200 100 0 -100

1 JB IF 4L 100 0 -100 -200 1 JB IF 5R 50 0 -50 -100 -150 1 JB IF 5L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

300 200 100 0

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 30-AUG-2005 15:47:57

1 JB IF 6R 100 0 -100

1 JB IF 6L 50 0 -50 -100 -150 1 JB IF 7R 50 0 -50 -100 -150

1 JB IF 7L 50 0 -50 -100 -150 1 JB IF 8R 100 0 -100 1 JB IF 8L

Degrees

100 0 -100 2 WB IF 1R 20 10 0 -10 2 WB IF 1L 20 0 -20 -40 2 WB IF 2R 10 0 -10 2 WB IF 2L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

10 0 -10

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 30-AUG-2005 15:47:57

2 WB IF 3R 20 0 -20 -40 -60 2 WB IF 3L 20 0 -20 -40 -60 2 WB IF 4R 20 0 -20 -40 -60 2 WB IF 4L 150 100 50 0 2 WB IF 5R 20 10 0 -10 2 WB IF 5L

Degrees

280 270 260 2 WB IF 6R 10 0 -10 -20 2 WB IF 6L 240 220 200 180 2 WB IF 7R 0 -50 -100 -150 2 WB IF 7L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

240 220 200 180

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 30-AUG-2005 15:47:57

2 WB IF 8R 260 240 220 200 180 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

3 EF IF 3R

Degrees

0.010 0.005 0.000 -0.005

3 EF IF 3L

0.010 0.005 0.000 -0.005

3 EF IF 4R

0.010 0.005 0.000 -0.005

3 EF IF 4L

0.010 0.005 0.000 -0.005

3 EF IF 5R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 30-AUG-2005 15:47:57

3 EF IF 6R

0.010 0.005 0.000 -0.005

3 EF IF 6L

0.010 0.005 0.000 -0.005

3 EF IF 7R

0.010 0.005 0.000 -0.005

3 EF IF 7L

0.010 0.005 0.000 -0.005

3 EF IF 8R

0.010 0.005 0.000 -0.005

3 EF IF 8L

Degrees

0.010 0.005 0.000 -0.005

4 ON IF 1R 10 0 -10 4 ON IF 1L 20 0 -20 4 ON IF 2R 20 0 -20 4 ON IF 2L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

20 0 -20

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 30-AUG-2005 15:47:57

4 ON IF 3R 20 10 0 -10 4 ON IF 3L 20 10 0 -10 4 ON IF 4R 20 0 -20 -40 -60 -80 4 ON IF 4L 20 0 -20 4 ON IF 5R 20 0 -20 4 ON IF 5L

Degrees

-80 -100

-120

4 ON IF 6R 20 10 0 -10 4 ON IF 6L 250 200 150 100 50 4 ON IF 7R 20 10 0 -10 4 ON IF 7L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

250 200 150 100 50

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 30-AUG-2005 15:47:57

4 ON IF 8R 100 0 -100

4 ON IF 8L 100 0 -100

5 MC IF 1R 20 0 -20 5 MC IF 1L 20 0 -20 5 MC IF 2R 40 20 0 -20 5 MC IF 2L

Degrees

10 0 -10 -20 5 MC IF 3R 20 0 -20 -40 -60 5 MC IF 3L 40 20 0 -20 5 MC IF 4R 10 0 -10 5 MC IF 4L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

150 100 50 0

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 30-AUG-2005 15:47:57

5 MC IF 5R 0 -50 -100

5 MC IF 5L 0 -50 -100

5 MC IF 6R 20 10 0 -10 5 MC IF 6L 50 0 -50 -100

5 MC IF 7R 10 0 -10 5 MC IF 7L

Degrees

100 0 -100

5 MC IF 8R 100 0 -100 -200

5 MC IF 8L 100 0 -100

6 TR IF 1R 100 0 -100

6 TR IF 1L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

100 0 -100

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 30-AUG-2005 15:47:57

6 TR IF 2R 100 0 -100

6 TR IF 2L 100 0 -100

6 TR IF 3L 100 0 -100

6 TR IF 4L 100 0 -100

6 TR IF 5R 50 0 -50 6 TR IF 5L

Degrees

0 -50 -100 -150

6 TR IF 6R 100 0 -100

6 TR IF 6L 250 200 150 6 TR IF 7R 100 0 -100

6 TR IF 7L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

250 200 150

Gain phs vs UTC time for J1825-1718.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 30-AUG-2005 15:47:57

6 TR IF 8R 100 0 -100

6 TR IF 8L 100 0 -100

8 HH IF 2R

-129.395 -129.400 -129.405 -129.410

8 HH IF 3R 120 100 80 60 40 20 8 HH IF 4L

-36.195 -36.200 -36.205 -36.210

8 HH IF 6R

Degrees

82.745 82.740 82.735 82.730

8 HH IF 6L

16.930 16.925 16.920 16.915

8 HH IF 7L

51.145 51.140 51.135 51.130

8 HH IF 8R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03

53.295 53.290 53.285 53.280