Center at RA 18 25 36.53227 DEC -17 18 49.8484

CONT: J1825-17 IPOL 4989.521 MHZ J1825-1718.IIM001.1

PLot file version 1 created 30-AUG-2005 15:46:43

Cont peak flux = 3.1392E-01 JY/BEAM Levs = 3.139E-01 * (-0.197, 0.197, 0.393, 0.787)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100