Center at RA 17 48 05.81967 DEC 34 04 01.1800

CONT: J1748+34 IPOL 1656.365 MHZ J1748+3404.IIM001.1

PLot file version 1 created 21-APR-2005 13:17:10

Cont peak flux = 1.3920E-01 JY/BEAM Levs = 1.392E-01 * (-0.201, 0.201, 0.403, 0.806)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250