Plot file version 1 created 01-JUN-2004 15:53:47 Amplitude vs UV dist for J1310+3220.MULTI.1 Source:J1310+3220 Ants * - * Stokes I IF# 1 - 4 Chan# 1

Freq = 4.9715 GHz, Bw = 8.000 MHz

Janskys

Mega Wavlngth

0 20 40 60 80 100 120 140 160

5.0

4.5

4.0

3.5

3.0

2.5

2.0

1.5

1.0

0.5

0.0