Center at RA 21 36 38.58630 DEC 00 41 54.2133

CONT: J2136+00 IPOL 4986.302 MHZ J2136+0041.IIM001.2

PLot file version 1 created 01-JUN-2004 15:51:37

Cont peak flux = 4.4146E+00 JY/BEAM Levs = 4.415E+00 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100