Gain amp vs UTC time for 1504-166.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 09-MAR-2004 17:50:19

1 ON IF 1R 930 920 910 1 ON IF 1L 990 980 970 960 1 ON IF 2R 900 890 880 1 ON IF 2L 940 920 900 2 WB IF 1R

1025 1020 1015 1010 1005

2 WB IF 1L

MilliGain

1010

1000 990 2 WB IF 2R

1025 1020 1015 1010 1005

2 WB IF 2L

1020

1010

1000 3 MC IF 1R

1000 990 980 3 MC IF 1L

TIME (HOURS)

13 35 40 45 50 55 14 00 05 10 15

1005 1000 995 990 985

Gain amp vs UTC time for 1504-166.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 09-MAR-2004 17:50:19

3 MC IF 2R

1000 980 960 940 3 MC IF 2L

1020 1000 980 960 4 EF IF 1R

1010 1000 990 980 970 4 EF IF 1L

1000 990 980 970 4 EF IF 2R

1030 1020 1010 1000 990 4 EF IF 2L

MilliGain

1000 980 960 7 NT IF 1R 900 850 800 7 NT IF 1L

1500 1450 1400

7 NT IF 2R 940 920 900 880 860 7 NT IF 2L

TIME (HOURS)

13 35 40 45 50 55 14 00 05 10 15

1060 1040 1020 1000 980 960

Gain amp vs UTC time for 1504-166.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 09-MAR-2004 17:50:19

10 HH IF 1R

1100

1000 900 10 HH IF 1L

1200

1100

1000

10 HH IF 2R

1000 980 960 10 HH IF 2L

MilliGain

TIME (HOURS)

13 35 40 45 50 55 14 00 05 10 15

1040 1020 1000 980 960 940