Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 09-MAR-2004 17:13:38

1 ON IF 1R

0.905 0.900 0.895 0.890

1 ON IF 2R

0.900 0.895 0.890 0.885

2 WB IF 2R

20.205 20.200 20.195 20.190 3 MC IF 1R

1.440 1.435 1.430 1.425 3 MC IF 2R

1.470 1.465 1.460 1.455 4 EF IF 1R

Gain

1.045 1.040 1.035 1.030

4 EF IF 2R

TIME (HOURS)

14 34 30 35 00 30 36 00 30

1.050 1.045 1.040 1.035