Gain amp vs UTC time for J0244+6228.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 09-MAR-2004 17:52:00

1 ON IF 1R 1.2 1.0 0.8 1 ON IF 1L 1.3 1.2 1.1 1.0 0.9 1 ON IF 2R 1.2 1.0 0.8 1 ON IF 2L 1.2 1.0 0.8 2 WB IF 1R 1.4 1.2 1.0 0.8 2 WB IF 1L

Gain

1.4 1.2 1.0 0.8 2 WB IF 2R 1.2 1.0 0.8 2 WB IF 2L 1.4 1.2 1.0 0.8 3 MC IF 1R 1.0 0.8 0.6 3 MC IF 1L

TIME (HOURS)

16 17 18 19 20 21 22 23

1.0 0.8 0.6 0.4

Gain amp vs UTC time for J0244+6228.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 09-MAR-2004 17:52:00

3 MC IF 2R 1.0 0.8 0.6 3 MC IF 2L 1.0 0.8 0.6 4 EF IF 1R 1.1 1.0 0.9 4 EF IF 1L

1.10 1.05 1.00 0.95

4 EF IF 2R 1.1 1.0 0.9 4 EF IF 2L

Gain

1.1 1.0 0.9 7 NT IF 1R 1.4 1.2 1.0 0.8 7 NT IF 1L 2.5 2.0 1.5 7 NT IF 2R 1.6 1.4 1.2 1.0 0.8 7 NT IF 2L

TIME (HOURS)

16 17 18 19 20 21 22 23

1.8 1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J0244+6228.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 09-MAR-2004 17:52:00

8 UR IF 1L 2.7 2.6 2.5 2.4 8 UR IF 2L 5.6 5.4 5.2 9 SH IF 1L

46.045 46.040 46.035 46.030 9 SH IF 2L

3.930 3.925 3.920 3.915 10 HH IF 1R

8.290 8.285 8.280 8.275

10 HH IF 1L

Gain

13.955 13.950 13.945 13.940

10 HH IF 2L

TIME (HOURS)

16 17 18 19 20 21 22 23

7.545 7.540 7.535 7.530