Center at RA 02 44 57.69683 DEC 62 28 06.5146

CONT: J0244+62 IPOL 4988.365 MHZ J0244+6228.ICL001.5

PLot file version 1 created 09-MAR-2004 17:53:20

Cont peak flux = 6.8498E-01 JY/BEAM Levs = 6.850E-01 * (-0.018, 0.018, 0.036, 0.073, 0.146, 0.291, 0.582)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100