Center at RA 11 46 58.29791 DEC 39 58 34.3046

CONT: J1146+39 IPOL 4988.365 MHZ J1146+3958.IIM001.2

PLot file version 1 created 09-MAR-2004 17:08:37

Cont peak flux = 4.2835E-01 JY/BEAM Levs = 4.283E-01 * (-0.399, 0.399, 0.798)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100