Center at RA 16 25 46.89164 DEC -25 27 38.3269

CONT: J1625-25 IPOL 4988.365 MHZ J1625-2527.ICL001.5

PLot file version 1 created 09-MAR-2004 17:53:32

Cont peak flux = 1.9834E+00 JY/BEAM Levs = 1.983E+00 * (-0.028, 0.028, 0.056, 0.112, 0.223, 0.447, 0.894)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100