Gain amp vs UTC time for J1922+0841.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 09-MAR-2004 17:51:32

1 ON IF 1R 0.8 0.7 0.6 0.5 1 ON IF 1L

0.80 0.75 0.70

1 ON IF 2R 0.8 0.7 0.6 1 ON IF 2L

0.75 0.70 0.65 0.60 2 WB IF 1R 1.4 1.2 1.0 0.8 2 WB IF 1L

Gain

1.0 0.9 0.8 2 WB IF 2R 1.1 1.0 0.9 0.8 2 WB IF 2L

1.05 1.00 0.95 0.90 3 MC IF 1R 2.0 1.5 1.0 3 MC IF 1L

TIME (HOURS)

15 16 17 18 19

1.1 1.0 0.9 0.8

Gain amp vs UTC time for J1922+0841.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 09-MAR-2004 17:51:32

3 MC IF 2R 1.3 1.2 1.1 1.0 0.9 3 MC IF 2L 1.1 1.0 0.9 0.8 4 EF IF 1R

1.00 0.95 0.90 0.85 4 EF IF 1L

1.05 1.00 0.95 0.90 0.85

4 EF IF 2R

1.00 0.95 0.90

4 EF IF 2L

Gain

1.0 0.9 0.8 7 NT IF 1R

0.95 0.90 0.85 0.80

7 NT IF 1L

1.42 1.40 1.38 1.36 1.34 1.32 7 NT IF 2R

1.00 0.95 0.90 0.85 7 NT IF 2L

TIME (HOURS)

15 16 17 18 19

1.15 1.10 1.05 1.00

Gain amp vs UTC time for J1922+0841.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 09-MAR-2004 17:51:32

10 HH IF 1L

4.040 4.035 4.030 4.025

10 HH IF 2R

0.415 0.410 0.405 0.400

10 HH IF 2L

Gain

TIME (HOURS)

15 16 17 18 19

1.820 1.815 1.810 1.805