Center at RA 19 22 18.63400 DEC 08 41 57.3920

CONT: J1922+08 IPOL 4988.365 MHZ J1922+0841.ICL001.5

PLot file version 1 created 09-MAR-2004 17:53:09

Cont peak flux = 7.5819E-02 JY/BEAM Levs = 7.582E-02 * (-0.385, 0.385, 0.770)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100