Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 02-MAR-2004 12:38:50

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EF IF 4R

0.010 0.005 0.000 -0.005

1 EF IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 1R 5 0 -5 -10 -15 2 WB IF 1L

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

5 0 -5 -10 -15

Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 02-MAR-2004 12:38:50

2 WB IF 2R 5 0 -5 -10 -15 2 WB IF 2L 5 0 -5 -10 -15 2 WB IF 3R 5 0 -5 -10 -15 2 WB IF 3L 5 0 -5 -10 -15 2 WB IF 4R 5 0 -5 -10 -15 2 WB IF 4L

Degrees

5 0 -5 -10 -15 3 ON IF 1R 10 5 0 -5 3 ON IF 1L 6 4 2 0 3 ON IF 2R 10 5 0 3 ON IF 2L

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

10 5 0

Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 02-MAR-2004 12:38:50

3 ON IF 3R 10 5 0 3 ON IF 3L

0.760 0.755 0.750 0.745

3 ON IF 4R

0.505 0.500 0.495 0.490 3 ON IF 4L 15 10 5 4 MC IF 1R 2 0 -2 -4 -6 4 MC IF 1L

Degrees

0 -2 -4 -6 4 MC IF 2R 0 -5 4 MC IF 2L 0 -5 -10 4 MC IF 3R 0 -5 -10 4 MC IF 3L

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

0 -5 -10

Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 02-MAR-2004 12:38:50

4 MC IF 4R 2 0 -2 -4 -6 -8 4 MC IF 4L 0 -5 -10 5 NT IF 1R 5 0 -5 -10 -15 5 NT IF 1L 5 0 -5 -10 -15 5 NT IF 2R 0 -5 -10 5 NT IF 2L

Degrees

5 0 -5 -10 -15 5 NT IF 3R 5 0 -5 -10 -15 5 NT IF 3L 5 0 -5 -10 -15 5 NT IF 4R 5 0 -5 -10 5 NT IF 4L

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

5 0 -5 -10 -15

Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 02-MAR-2004 12:38:50

6 JB IF 1R 10 0 -10 6 JB IF 1L 10 0 -10 -20 6 JB IF 2R 0 -10 -20 6 JB IF 2L 0 -10 -20 6 JB IF 3R 0 -10 -20 6 JB IF 3L

Degrees

0 -10 -20 6 JB IF 4R 0 -10 -20 6 JB IF 4L 0 -10 -20 7 UR IF 2L

-47.550 -47.555 -47.560 -47.565

7 UR IF 4R

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

136.820 136.815 136.810 136.805

Gain phs vs UTC time for 3C273.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 02-MAR-2004 12:38:50

7 UR IF 4L

-37.915 -37.920 -37.925 -37.930

9 HH IF 1R 10 0 -10 9 HH IF 1L 10 0 -10 -20 9 HH IF 2R 10 0 -10 -20 9 HH IF 2L 10 0 -10 -20 -30 9 HH IF 3R

Degrees

10 0 -10 -20 9 HH IF 3L 10 0 -10 -20 -30 9 HH IF 4R 0 -10 -20 -30 9 HH IF 4L

TIME (HOURS)

09 44 45 46 47 48 49 50 51 52 53

0 -10 -20