Center at RA 16 51 03.66200 DEC 01 29 23.4580

CONT: J1651+01 IPOL 1652.803 MHZ J1651+0129.IIM001.1

PLot file version 1 created 02-MAR-2004 12:33:44

Cont peak flux = 6.9608E-01 JY/BEAM Levs = 6.961E-01 * (-0.230, 0.230, 0.460, 0.920)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250