Center at RA 02 17 30.81336 DEC 73 49 32.6218

CONT: 0212+735 IPOL 22231.790 MHZ 0212+735.IIM001.2

PLot file version 1 created 09-AUG-2003 00:27:05

Cont peak flux = 5.3399E-01 JY/BEAM Levs = 5.340E-01 * (-0.197, 0.197, 0.394, 0.788)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40