Center at RA 03 19 48.16010 DEC 41 30 42.1060

CONT: 3C84 IPOL 22231.790 MHZ 3C84.ICL001.3

PLot file version 1 created 09-AUG-2003 00:29:27

Cont peak flux = 4.9408E-01 JY/BEAM Levs = 4.941E-01 * (-0.098, 0.098, 0.197, 0.393, 0.787)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40