IF 1 CHAN 1 STK LL of 3C84.ICL001.3

Ampltude andPhase vs Time for 3C84.MULTI.1 Vect aver. CL # 3

PLot file version 1 created 12-AUG-2003 19:03:27

3 2 1 0

MC - ON ( 1 - 2 )

100 0 -100

Janskys

3 2 1 0

MC - MH ( 1 - 3 )

100 0 -100 3 2 1 0

MC - NT ( 1 - 6 )

Degrees

TIME (HOURS)

14 08 00 30 09 00 30 10 00 30 11 00 30

100 0 -100

IF 2 CHAN 1 STK LL of 3C84.ICL001.3

Ampltude andPhase vs Time for 3C84.MULTI.1 Vect aver. CL # 3

PLot file version 2 created 12-AUG-2003 19:03:28

3 2 1 0

MC - ON ( 1 - 2 )

100 0 -100

Janskys

3 2 1 0

MC - MH ( 1 - 3 )

100 0 -100 3 2 1 0

MC - NT ( 1 - 6 )

Degrees

TIME (HOURS)

14 08 00 30 09 00 30 10 00 30 11 00 30

100 0 -100

IF 3 CHAN 1 STK LL of 3C84.ICL001.3

Ampltude andPhase vs Time for 3C84.MULTI.1 Vect aver. CL # 3

PLot file version 3 created 12-AUG-2003 19:03:28

3 2 1 0

MC - ON ( 1 - 2 )

100 0 -100

Janskys

3 2 1 0

MC - MH ( 1 - 3 )

100 0 -100 3 2 1 0

MC - NT ( 1 - 6 )

Degrees

TIME (HOURS)

14 08 00 30 09 00 30 10 00 30 11 00 30

100 0 -100

IF 4 CHAN 1 STK LL of 3C84.ICL001.3

Ampltude andPhase vs Time for 3C84.MULTI.1 Vect aver. CL # 3

PLot file version 4 created 12-AUG-2003 19:03:28

3 2 1 0

MC - ON ( 1 - 2 )

100 0 -100

Janskys

3 2 1 0

MC - MH ( 1 - 3 )

100 0 -100 3 2 1 0

MC - NT ( 1 - 6 )

Degrees

TIME (HOURS)

14 08 00 30 09 00 30 10 00 30 11 00 30

100 0 -100